// Lightweight unauthenticated health check used by Docker/Caddy.
// Returns 200 with a tiny JSON body. Do NOT touch the database here:
// the goal is only to confirm the Node process is serving HTTP.
export const loader = () =>
  new Response(JSON.stringify({ ok: true }), {
    status: 200,
    headers: { "content-type": "application/json" },
  });
